From 59262cee6979810ebf1f3cdd3a6399460682e292 Mon Sep 17 00:00:00 2001
From: Narayan Desai <desai@mcs.anl.gov>
Date: Tue, 21 Oct 2003 19:56:44 +0000
Subject: (Logical change 1.4)

git-svn-id: https://svn.mcs.anl.gov/repos/bcfg/trunk/bcfg2@11 ce84e21b-d406-0410-9b95-82705330c041
---
 doc/repository.tex | 35 +++++++++++++++++++++++++++++++++++
 1 file changed, 35 insertions(+)

(limited to 'doc/repository.tex')

diff --git a/doc/repository.tex b/doc/repository.tex
index e69de29bb..2068d2432 100644
--- a/doc/repository.tex
+++ b/doc/repository.tex
@@ -0,0 +1,35 @@
+\documentclass[11pt]{article}
+
+\title{Bcfg2 Repository Design}
+\author{Narayan Desai \\ desai@mcs.anl.gov}
+
+\setlength{\oddsidemargin}{0in}
+\setlength{\evensidemargin}{0in}
+\setlength{\topmargin}{0.0in}
+\setlength{\headheight}{0in}
+\setlength{\headsep}{0.5in}
+\setlength{\textwidth}{6.5in}
+\setlength{\textheight}{8.5in}
+\setlength{\parskip}{0.05in}
+
+\begin{document}
+\maketitle
+
+The BCFG repository is the storage depot for all components of client
+configurations. In BCFG1, this depot was composed of several SQL
+database tables and a filesystem hierarchy, composed of several types
+of data. 
+
+One of the high-level features desired from BCFG from the start was
+the ability for configuration changes, acquired through some automated
+mechanism, to be correctly installed into the configuration
+repository.  While using this ad-hoc repository, the underlying
+structure of data made automatic inclusion of new configuration
+fragments difficult. To address this problem, we have redesigned the
+repository to allow better data access and update semantics. 
+
+\section{Why is an ad-hoc repository problematic?'}
+
+\section{Design}
+
+\end{document}
\ No newline at end of file
-- 
cgit v1.2.3-1-g7c22

