From d4ec6d3bf42d257851304fe9588f2db8bbbefa13 Mon Sep 17 00:00:00 2001
From: Christopher Speller <crspeller@gmail.com>
Date: Mon, 2 Nov 2015 10:32:00 -0500
Subject: Removing useless resize alert function in PostBody

---
 web/react/components/post.jsx | 4 +---
 1 file changed, 1 insertion(+), 3 deletions(-)

(limited to 'web/react/components/post.jsx')

diff --git a/web/react/components/post.jsx b/web/react/components/post.jsx
index dedac8951..c3c5b3e0b 100644
--- a/web/react/components/post.jsx
+++ b/web/react/components/post.jsx
@@ -204,7 +204,6 @@ export default class Post extends React.Component {
                             posts={posts}
                             handleCommentClick={this.handleCommentClick}
                             retryPost={this.retryPost}
-                            resize={this.props.resize}
                         />
                         <PostInfo
                             ref='info'
@@ -228,6 +227,5 @@ Post.propTypes = {
     sameUser: React.PropTypes.bool,
     sameRoot: React.PropTypes.bool,
     hideProfilePic: React.PropTypes.bool,
-    isLastComment: React.PropTypes.bool,
-    resize: React.PropTypes.func
+    isLastComment: React.PropTypes.bool
 };
-- 
cgit v1.2.3-1-g7c22

