From c84e091f2a55d12889e6ad4cb3a94017035fd881 Mon Sep 17 00:00:00 2001
From: Reed Garmsen <rgarmsen2295@gmail.com>
Date: Mon, 15 Jun 2015 09:37:26 -0700
Subject: Invalid RootId parameter error message no longer displays on the
 client.  Changed acceptance of error from Agree to Okay.

---
 web/react/components/post_deleted_modal.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'web/react/components/post_deleted_modal.jsx')

diff --git a/web/react/components/post_deleted_modal.jsx b/web/react/components/post_deleted_modal.jsx
index 307120df3..83b007bad 100644
--- a/web/react/components/post_deleted_modal.jsx
+++ b/web/react/components/post_deleted_modal.jsx
@@ -23,7 +23,7 @@ module.exports = React.createClass({
                             <p>Someone deleted the message on which you tried to post a comment.</p>
                         </div>
                         <div className="modal-footer">
-                          <button type="button" className="btn btn-primary" data-dismiss="modal">Agree</button>
+                          <button type="button" className="btn btn-primary" data-dismiss="modal">Okay</button>
                         </div>
                       </div>
                    </div>
-- 
cgit v1.2.3-1-g7c22

