From d36c1de9410b8899ee66e01d341e67ca3b35b179 Mon Sep 17 00:00:00 2001
From: nickago <ngonella@calpoly.edu>
Date: Wed, 12 Aug 2015 09:38:10 -0700
Subject: Changed the default for update to hold your position in the list

---
 web/react/components/post_list.jsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'web/react/components/post_list.jsx')

diff --git a/web/react/components/post_list.jsx b/web/react/components/post_list.jsx
index d09c2e537..e80351be5 100644
--- a/web/react/components/post_list.jsx
+++ b/web/react/components/post_list.jsx
@@ -29,7 +29,7 @@ function getStateFromStores() {
 module.exports = React.createClass({
     displayName: "PostList",
     oldZoom: 0,
-    holdPosition: false,            // The default state is to scroll to the bottom on change
+    holdPosition: true,            // The default state is to hold your scroll position
                                     // This behavior should NOT be taken advantage of, always set this to the desired state
 
     scrollHeightFromBottom: 0,      // This represents the distance from the container's scrollHeight
@@ -137,7 +137,7 @@ module.exports = React.createClass({
         } else {
             container.scrollTop(container[0].scrollHeight - container.innerHeight());
         }
-        this.holdPosition = false;
+        this.holdPosition = true;
     },
     onResize: function() {
         this.holdPosition = true;
-- 
cgit v1.2.3-1-g7c22

