From b1ce1a89236942ec844a1aa5563e7573cec918b1 Mon Sep 17 00:00:00 2001
From: Asaad Mahmood <asaad@spinpunch.com>
Date: Mon, 16 Nov 2015 20:01:14 +0500
Subject: Multiple UI Improvements

---
 web/react/components/rhs_thread.jsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'web/react/components/rhs_thread.jsx')

diff --git a/web/react/components/rhs_thread.jsx b/web/react/components/rhs_thread.jsx
index 7c11de7cf..31dc92f80 100644
--- a/web/react/components/rhs_thread.jsx
+++ b/web/react/components/rhs_thread.jsx
@@ -118,7 +118,6 @@ export default class RhsThread extends React.Component {
     }
     resize() {
         var height = this.state.windowHeight - $('#error_bar').outerHeight() - 100;
-        $('.post-right__scroll').css('height', height + 'px');
         $('.post-right__scroll').scrollTop(100000);
         if (this.state.windowWidth > 768) {
             $('.post-right__scroll').perfectScrollbar();
-- 
cgit v1.2.3-1-g7c22

