From 46f448899bf715fa2b557562a6a01d80ca4fc6b4 Mon Sep 17 00:00:00 2001
From: JoramWilander <jwawilander@gmail.com>
Date: Thu, 22 Oct 2015 14:16:51 -0400
Subject: In webhooks UI handle error if channel can't be found, also use
 display name over url name, plus warning fixes

---
 web/react/components/user_settings/user_settings_integrations.jsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'web/react/components/user_settings/user_settings_integrations.jsx')

diff --git a/web/react/components/user_settings/user_settings_integrations.jsx b/web/react/components/user_settings/user_settings_integrations.jsx
index 231580cc3..1845ca28c 100644
--- a/web/react/components/user_settings/user_settings_integrations.jsx
+++ b/web/react/components/user_settings/user_settings_integrations.jsx
@@ -37,7 +37,7 @@ export default class UserSettingsIntegrationsTab extends React.Component {
         if (global.window.config.EnableIncomingWebhooks === 'true') {
             if (this.props.activeSection === 'incoming-hooks') {
                 inputs.push(
-                    <ManageIncomingHooks />
+                    <ManageIncomingHooks key='incoming-hook-ui' />
                 );
 
                 incomingHooksSection = (
@@ -68,7 +68,7 @@ export default class UserSettingsIntegrationsTab extends React.Component {
         if (global.window.config.EnableOutgoingWebhooks === 'true') {
             if (this.props.activeSection === 'outgoing-hooks') {
                 inputs.push(
-                    <ManageOutgoingHooks />
+                    <ManageOutgoingHooks key='outgoing-hook-ui' />
                 );
 
                 outgoingHooksSection = (
-- 
cgit v1.2.3-1-g7c22

