From b2a679c25da42c4665059965830858da4f0ec238 Mon Sep 17 00:00:00 2001
From: =Corey Hulen <corey@hulen.com>
Date: Tue, 15 Sep 2015 18:59:14 -0700
Subject: PLT-93 cleaing up client side configs

---
 web/react/pages/login.jsx | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'web/react/pages/login.jsx')

diff --git a/web/react/pages/login.jsx b/web/react/pages/login.jsx
index 424ae0e84..830f622fa 100644
--- a/web/react/pages/login.jsx
+++ b/web/react/pages/login.jsx
@@ -3,12 +3,12 @@
 
 var Login = require('../components/login.jsx');
 
-function setupLoginPage(teamDisplayName, teamName, authServices) {
+function setupLoginPage(props) {
     React.render(
         <Login
-            teamDisplayName={teamDisplayName}
-            teamName={teamName}
-            authServices={authServices}
+            teamDisplayName={props.TeamDisplayName}
+            teamName={props.TeamName}
+            authServices={props.AuthServices}
         />,
         document.getElementById('login')
     );
-- 
cgit v1.2.3-1-g7c22

