From 5a597c96061712e1a08ddec2c15129ba2ed9e4f3 Mon Sep 17 00:00:00 2001
From: Reed Garmsen <rgarmsen2295@gmail.com>
Date: Tue, 30 Jun 2015 20:40:27 -0700
Subject: Added line that disables caching with a ajax client call that was
 causing errors to be thrown in IE10

---
 web/react/utils/client.jsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'web/react/utils/client.jsx')

diff --git a/web/react/utils/client.jsx b/web/react/utils/client.jsx
index 15b6ace91..a43e4eec5 100644
--- a/web/react/utils/client.jsx
+++ b/web/react/utils/client.jsx
@@ -280,6 +280,7 @@ module.exports.getMeSynchronous = function(success, error) {
         url: "/api/v1/users/me",
         dataType: 'json',
         contentType: 'application/json',
+        cache: false,
         type: 'GET',
         success: function(data, textStatus, xhr) {
             current_user = data;
-- 
cgit v1.2.3-1-g7c22

