From 04c12ba58e21297ebe08d0c1e489d5da81cba19e Mon Sep 17 00:00:00 2001
From: =Corey Hulen <corey@hulen.com>
Date: Thu, 24 Sep 2015 15:06:54 -0700
Subject: Fixing blue bar and renders warning when mis-configured.

---
 web/react/utils/client.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'web/react/utils/client.jsx')

diff --git a/web/react/utils/client.jsx b/web/react/utils/client.jsx
index 4effa7307..715e26197 100644
--- a/web/react/utils/client.jsx
+++ b/web/react/utils/client.jsx
@@ -27,7 +27,7 @@ function handleError(methodName, xhr, status, err) {
         msg = 'error in ' + methodName + ' status=' + status + ' statusCode=' + xhr.status + ' err=' + err;
 
         if (xhr.status === 0) {
-            e = {message: 'There appears to be a problem with your internet connection'};
+            e = {message: 'There appears to be a problem with your internet connection', connErrorCount: 1};
         } else {
             e = {message: 'We received an unexpected status code from the server (' + xhr.status + ')'};
         }
-- 
cgit v1.2.3-1-g7c22

