From 4b76d6a05d0142c9d1addca698a922e8929674e1 Mon Sep 17 00:00:00 2001
From: hmhealey <harrisonmhealey@gmail.com>
Date: Mon, 4 Jan 2016 12:23:46 -0500
Subject: Fixed ViewImage modal to clear its loaded state when its file list
 changes

---
 web/react/utils/utils.jsx | 10 ++++++++++
 1 file changed, 10 insertions(+)

(limited to 'web/react/utils/utils.jsx')

diff --git a/web/react/utils/utils.jsx b/web/react/utils/utils.jsx
index 24d27b10a..a808c9be3 100644
--- a/web/react/utils/utils.jsx
+++ b/web/react/utils/utils.jsx
@@ -1261,3 +1261,13 @@ export function isFeatureEnabled(feature) {
 export function isSystemMessage(post) {
     return post.type && (post.type.lastIndexOf(Constants.SYSTEM_MESSAGE_PREFIX) === 0);
 }
+
+export function fillArray(value, length) {
+    const arr = [];
+
+    for (let i = 0; i < length; i++) {
+        arr.push(value);
+    }
+
+    return arr;
+}
-- 
cgit v1.2.3-1-g7c22

