From 76f000056512d323febeb6c941e43efb438030ba Mon Sep 17 00:00:00 2001
From: Reed Garmsen <rgarmsen2295@gmail.com>
Date: Tue, 19 Jan 2016 12:39:51 -0800
Subject: Removed extraneous error when providing a short username

---
 web/react/utils/utils.jsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'web/react/utils/utils.jsx')

diff --git a/web/react/utils/utils.jsx b/web/react/utils/utils.jsx
index 24042321f..c51ae1a21 100644
--- a/web/react/utils/utils.jsx
+++ b/web/react/utils/utils.jsx
@@ -879,8 +879,8 @@ export function isValidUsername(name) {
     var error = '';
     if (!name) {
         error = 'This field is required';
-    } else if (name.length < 3 || name.length > 15) {
-        error = 'Must be between 3 and 15 characters';
+    } else if (name.length < Constants.MIN_USERNAME_LENGTH || name.length > Constants.MAX_USERNAME_LENGTH) {
+        error = 'Must be between ' + Constants.MIN_USERNAME_LENGTH + ' and ' + Constants.MAX_USERNAME_LENGTH + ' characters';
     } else if (!(/^[a-z0-9\.\-\_]+$/).test(name)) {
         error = "Must contain only letters, numbers, and the symbols '.', '-', and '_'.";
     } else if (!(/[a-z]/).test(name.charAt(0))) { //eslint-disable-line no-negated-condition
-- 
cgit v1.2.3-1-g7c22

