From e621950364c93365fad4dbbbb6e94360d2fce809 Mon Sep 17 00:00:00 2001
From: Reed Garmsen <rgarmsen2295@gmail.com>
Date: Sun, 28 Jun 2015 19:38:19 -0700
Subject: Removed test code

---
 web/react/utils/utils.jsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'web/react/utils/utils.jsx')

diff --git a/web/react/utils/utils.jsx b/web/react/utils/utils.jsx
index 128d9d1e7..75c583c8f 100644
--- a/web/react/utils/utils.jsx
+++ b/web/react/utils/utils.jsx
@@ -25,7 +25,7 @@ module.exports.cleanUpUrlable = function(input) {
 
 module.exports.isTestDomain = function() {
 
-    /*if ((/^localhost/).test(window.location.hostname))
+    if ((/^localhost/).test(window.location.hostname))
         return true;
 
     if ((/^dockerhost/).test(window.location.hostname))
@@ -44,7 +44,7 @@ module.exports.isTestDomain = function() {
         return true;
 
     if ((/^176./).test(window.location.hostname))
-        return true;*/
+        return true;
 
     return false;
 };
-- 
cgit v1.2.3-1-g7c22

