From d6a6668a39db2f78d59919686c5d7b901888da36 Mon Sep 17 00:00:00 2001
From: Christopher Speller <crspeller@gmail.com>
Date: Thu, 24 Mar 2016 11:27:05 -0400
Subject: Modifying login not to display until it has finished checking. Caused
 admin console to redirect to town-square. Will be changed after user model
 flip.

---
 webapp/components/admin_console/admin_navbar_dropdown.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'webapp/components/admin_console/admin_navbar_dropdown.jsx')

diff --git a/webapp/components/admin_console/admin_navbar_dropdown.jsx b/webapp/components/admin_console/admin_navbar_dropdown.jsx
index 9644a2e7f..527f97959 100644
--- a/webapp/components/admin_console/admin_navbar_dropdown.jsx
+++ b/webapp/components/admin_console/admin_navbar_dropdown.jsx
@@ -64,7 +64,7 @@ export default class AdminNavbarDropdown extends React.Component {
                     >
                         <li>
                             <Link
-                                to={Utils.getWindowLocationOrigin() + '/' + this.state.currentTeam.name}
+                                to={Utils.getWindowLocationOrigin() + '/' + this.state.currentTeam.name + '/channels/town-square'}
                             >
                                 <FormattedMessage
                                     id='admin.nav.switch'
-- 
cgit v1.2.3-1-g7c22

