From db29413000f695b09bfbc4846b6558eaf72cf0bf Mon Sep 17 00:00:00 2001
From: Asaad Mahmood <asaadmahmoodspin@users.noreply.github.com>
Date: Wed, 25 May 2016 17:39:14 +0500
Subject: Minor UI improvements (#3095)

Updating config.json

Updating config.json

Updating config.json

Updating config.json
---
 webapp/components/admin_console/admin_navbar_dropdown.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'webapp/components/admin_console/admin_navbar_dropdown.jsx')

diff --git a/webapp/components/admin_console/admin_navbar_dropdown.jsx b/webapp/components/admin_console/admin_navbar_dropdown.jsx
index a923efc70..dc0a987d3 100644
--- a/webapp/components/admin_console/admin_navbar_dropdown.jsx
+++ b/webapp/components/admin_console/admin_navbar_dropdown.jsx
@@ -111,7 +111,7 @@ export default class AdminNavbarDropdown extends React.Component {
                                 <i className='fa fa-exchange'/>
                                 <FormattedMessage
                                     id='admin.nav.switch'
-                                    defaultMessage='Switch Teams'
+                                    defaultMessage='Team Selection'
                                 />
                             </Link>
                         </li>
-- 
cgit v1.2.3-1-g7c22

