From 93f2b6a83302ceef5c98be4fb696840608ad3bc3 Mon Sep 17 00:00:00 2001
From: Christopher Speller <crspeller@gmail.com>
Date: Fri, 23 Sep 2016 12:29:54 -0400
Subject: Updating ESLint (#4085)

---
 webapp/components/admin_console/cluster_table.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'webapp/components/admin_console/cluster_table.jsx')

diff --git a/webapp/components/admin_console/cluster_table.jsx b/webapp/components/admin_console/cluster_table.jsx
index c8a98fd76..4aca796a0 100644
--- a/webapp/components/admin_console/cluster_table.jsx
+++ b/webapp/components/admin_console/cluster_table.jsx
@@ -121,7 +121,7 @@ export default class ClusterTable extends React.Component {
                         className='btn btn-link'
                         onClick={this.props.reload}
                     >
-                        <i className='fa fa-refresh'></i>
+                        <i className='fa fa-refresh'/>
                         <FormattedMessage
                             id='admin.cluster.status_table.reload'
                             defaultMessage=' Reload Cluster Status'
-- 
cgit v1.2.3-1-g7c22

