From 02f09b8af90f1df38762b5257291b31597575dbb Mon Sep 17 00:00:00 2001
From: Jeff Schering <jeffschering@gmail.com>
Date: Tue, 6 Jun 2017 13:37:40 -0700
Subject: Updating Site URL help text in System Console (#6582)

* Updating Site URL help text in System Console

* Replacing single quotes with double quotes

* Corrected statement about non-standard ports

* Converted double quotes to single quotes
---
 webapp/components/admin_console/configuration_settings.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'webapp/components/admin_console/configuration_settings.jsx')

diff --git a/webapp/components/admin_console/configuration_settings.jsx b/webapp/components/admin_console/configuration_settings.jsx
index 29901ad90..f352bf24f 100644
--- a/webapp/components/admin_console/configuration_settings.jsx
+++ b/webapp/components/admin_console/configuration_settings.jsx
@@ -105,7 +105,7 @@ export default class ConfigurationSettings extends AdminSettings {
                     helpText={
                         <FormattedMessage
                             id='admin.service.siteURLDescription'
-                            defaultMessage='The URL, including port number and protocol, that users will use to access Mattermost. This setting is required.'
+                            defaultMessage='The URL that users will use to access Mattermost. Standard ports, such as 80 and 443, can be omitted, but non-standard ports are required. For example: http://mattermost.example.com:8065. This setting is required.'
                         />
                     }
                     value={this.state.siteURL}
-- 
cgit v1.2.3-1-g7c22

