From 005dd0754ba6dec00d8e4a84a297d0f35fbefb2b Mon Sep 17 00:00:00 2001
From: Joram Wilander <jwawilander@gmail.com>
Date: Wed, 28 Jun 2017 10:34:00 -0400
Subject: Update gorp to support query timeouts on postgres (#6730)

* Update gorp to support query timeouts on postgres

* Update help text to remove postgres exception

* Fix glide.lock
---
 webapp/components/admin_console/database_settings.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'webapp/components/admin_console/database_settings.jsx')

diff --git a/webapp/components/admin_console/database_settings.jsx b/webapp/components/admin_console/database_settings.jsx
index 7b8891b2a..e182db70e 100644
--- a/webapp/components/admin_console/database_settings.jsx
+++ b/webapp/components/admin_console/database_settings.jsx
@@ -142,7 +142,7 @@ export default class DatabaseSettings extends AdminSettings {
                     helpText={
                         <FormattedMessage
                             id='admin.sql.queryTimeoutDescription'
-                            defaultMessage='The number of seconds to wait for a response from the database after opening a connection and sending the query. Errors that you see in the UI or in the logs as a result of a query timeout can vary depending on the type of query. This setting has no effect on PostgreSQL databases.'
+                            defaultMessage='The number of seconds to wait for a response from the database after opening a connection and sending the query. Errors that you see in the UI or in the logs as a result of a query timeout can vary depending on the type of query.'
                         />
                     }
                     value={this.state.queryTimeout}
-- 
cgit v1.2.3-1-g7c22

