From 860f2c8332f34d02e53ea1460decb4d1490bcbd4 Mon Sep 17 00:00:00 2001
From: Asaad Mahmood <asaadmahmood@users.noreply.github.com>
Date: Mon, 31 Jul 2017 17:10:43 +0500
Subject: Multiple Ui improvements (#7029)

* PLT-7119 - Updating headings on compact view

* PLT-7103 - Removing line below channel intro

* PLT-7112 - Fixing system console banner

* PLT-7144 - Adding ellipsis to system console boxes

* PLT-7181 - Changing channel header opacity

* PLT-6899 - Updating unread bar

* Updating margin for new messages indicator
---
 webapp/components/admin_console/database_settings.jsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'webapp/components/admin_console/database_settings.jsx')

diff --git a/webapp/components/admin_console/database_settings.jsx b/webapp/components/admin_console/database_settings.jsx
index 303865d91..9f008483c 100644
--- a/webapp/components/admin_console/database_settings.jsx
+++ b/webapp/components/admin_console/database_settings.jsx
@@ -108,12 +108,12 @@ export default class DatabaseSettings extends AdminSettings {
 
         return (
             <SettingsGroup>
-                <p>
+                <div className='banner'>
                     <FormattedMessage
                         id='admin.sql.noteDescription'
                         defaultMessage='Changing properties in this section will require a server restart before taking effect.'
                     />
-                </p>
+                </div>
                 <div className='form-group'>
                     <label
                         className='control-label col-sm-4'
-- 
cgit v1.2.3-1-g7c22

