From e0fca16b27b35d6d4303e5a76f10a689fdefcce3 Mon Sep 17 00:00:00 2001
From: Asaad Mahmood <asaadmahmoodspin@users.noreply.github.com>
Date: Fri, 3 Jun 2016 00:33:52 +0500
Subject: PLT-3010 - Updating system console (#3146)

* Updating system console

* Updating system console stuff

* Updating ldap settings
---
 webapp/components/admin_console/public_link_settings.jsx | 13 +++----------
 1 file changed, 3 insertions(+), 10 deletions(-)

(limited to 'webapp/components/admin_console/public_link_settings.jsx')

diff --git a/webapp/components/admin_console/public_link_settings.jsx b/webapp/components/admin_console/public_link_settings.jsx
index 9024261fa..97f841c23 100644
--- a/webapp/components/admin_console/public_link_settings.jsx
+++ b/webapp/components/admin_console/public_link_settings.jsx
@@ -34,8 +34,8 @@ export default class PublicLinkSettings extends AdminSettings {
         return (
             <h3>
                 <FormattedMessage
-                    id='admin.security.title'
-                    defaultMessage='Security Settings'
+                    id='admin.security.public_links'
+                    defaultMessage='Public Links'
                 />
             </h3>
         );
@@ -43,14 +43,7 @@ export default class PublicLinkSettings extends AdminSettings {
 
     renderSettings() {
         return (
-            <SettingsGroup
-                header={
-                    <FormattedMessage
-                        id='admin.security.public_links'
-                        defaultMessage='Public Links'
-                    />
-                }
-            >
+            <SettingsGroup>
                 <BooleanSetting
                     id='enablePublicLink'
                     label={
-- 
cgit v1.2.3-1-g7c22

