From 94e734c1bdc2f7e377a469c57add45cf9261fba7 Mon Sep 17 00:00:00 2001
From: Saturnino Abril <saturnino.abril@gmail.com>
Date: Thu, 29 Jun 2017 22:36:55 +0800
Subject: [PLT-6655] Remove 1024 character limit with text settings at system
 console, except sitename of custom branding (#6597)

* remove 1024 character limit with text settings at system console, except sitename of custom branding

* add ability to set textarea of TextSetting
---
 webapp/components/admin_console/text_setting.jsx | 5 ++---
 1 file changed, 2 insertions(+), 3 deletions(-)

(limited to 'webapp/components/admin_console/text_setting.jsx')

diff --git a/webapp/components/admin_console/text_setting.jsx b/webapp/components/admin_console/text_setting.jsx
index 879e352a4..5830828d2 100644
--- a/webapp/components/admin_console/text_setting.jsx
+++ b/webapp/components/admin_console/text_setting.jsx
@@ -6,7 +6,6 @@ import PropTypes from 'prop-types';
 import React from 'react';
 
 import Setting from './setting.jsx';
-import Constants from 'utils/constants.jsx';
 
 export default class TextSetting extends React.Component {
     static get propTypes() {
@@ -32,7 +31,7 @@ export default class TextSetting extends React.Component {
     static get defaultProps() {
         return {
             type: 'input',
-            maxLength: Constants.MAX_TEXTSETTING_LENGTH
+            maxLength: null
         };
     }
 
@@ -67,9 +66,9 @@ export default class TextSetting extends React.Component {
                     id={this.props.id}
                     className='form-control'
                     rows='5'
-                    maxLength='1024'
                     placeholder={this.props.placeholder}
                     value={this.props.value}
+                    maxLength={this.props.maxLength}
                     onChange={this.handleChange}
                     disabled={this.props.disabled}
                 />
-- 
cgit v1.2.3-1-g7c22

