From 56dc863de14da2c5d6b897352e91384a91a40f94 Mon Sep 17 00:00:00 2001
From: Pierre Rudloff <contact@rudloff.pro>
Date: Wed, 21 Dec 2016 23:29:38 +0100
Subject: Fix some typos in the English locale (fixes #4663) (#4793)

---
 webapp/components/audit_table.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'webapp/components/audit_table.jsx')

diff --git a/webapp/components/audit_table.jsx b/webapp/components/audit_table.jsx
index 8638910a2..c70c659d4 100644
--- a/webapp/components/audit_table.jsx
+++ b/webapp/components/audit_table.jsx
@@ -98,7 +98,7 @@ const holders = defineMessages({
     },
     failedPassword: {
         id: 'audit_table.failedPassword',
-        defaultMessage: 'Failed to change password - tried to update user password who was logged in through oauth'
+        defaultMessage: 'Failed to change password - tried to update user password who was logged in through OAuth'
     },
     updatedRol: {
         id: 'audit_table.updatedRol',
-- 
cgit v1.2.3-1-g7c22

