From 11e0a7daa2a478b1dca5164c11aa4e41e5652f1b Mon Sep 17 00:00:00 2001
From: Mika Andrianarijaona <mikaoelitiana@users.noreply.github.com>
Date: Wed, 8 Feb 2017 19:40:32 +0300
Subject: display loading screen when changing team (#5325)

* display loading screen when changing team

* fix lint error
---
 webapp/components/channel_view.jsx | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'webapp/components/channel_view.jsx')

diff --git a/webapp/components/channel_view.jsx b/webapp/components/channel_view.jsx
index ff101bca7..dfeeeca28 100644
--- a/webapp/components/channel_view.jsx
+++ b/webapp/components/channel_view.jsx
@@ -70,7 +70,9 @@ export default class ChannelView extends React.Component {
                 <ChannelHeader
                     channelId={this.state.channelId}
                 />
-                <PostViewCache/>
+                <PostViewCache
+                    channelId={this.state.channelId}
+                />
                 <div
                     className='post-create__container'
                     id='post-create'
-- 
cgit v1.2.3-1-g7c22

