From 145876681f03f68d2fcdd4f0339f6b2b9f7b9958 Mon Sep 17 00:00:00 2001
From: enahum <nahumhbl@gmail.com>
Date: Mon, 5 Dec 2016 10:19:12 -0300
Subject: Fix react warnings and part of backstage (#4706)

---
 webapp/components/get_link_modal.jsx | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'webapp/components/get_link_modal.jsx')

diff --git a/webapp/components/get_link_modal.jsx b/webapp/components/get_link_modal.jsx
index 5363ad217..8d4cbbc1c 100644
--- a/webapp/components/get_link_modal.jsx
+++ b/webapp/components/get_link_modal.jsx
@@ -90,10 +90,11 @@ export default class GetLinkModal extends React.Component {
                 className='form-control no-resize min-height'
                 ref='textarea'
                 value={this.props.link}
+                readOnly={true}
             />
         );
 
-        var copyLinkConfirm = null;
+        let copyLinkConfirm = null;
         if (this.state.copiedLink) {
             copyLinkConfirm = (
                 <p className='alert alert-success alert--confirm'>
-- 
cgit v1.2.3-1-g7c22

