From bb5ca5a8780f9259306d881e85760de8b87ddea8 Mon Sep 17 00:00:00 2001
From: enahum <nahumhbl@gmail.com>
Date: Fri, 10 Jun 2016 11:00:19 -0300
Subject: PLT-3244 On Password Reset page, an imprecise error message is
 displayed (#3295)

---
 webapp/components/password_reset_form.jsx | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'webapp/components/password_reset_form.jsx')

diff --git a/webapp/components/password_reset_form.jsx b/webapp/components/password_reset_form.jsx
index 887bc0c8e..eeea265d8 100644
--- a/webapp/components/password_reset_form.jsx
+++ b/webapp/components/password_reset_form.jsx
@@ -29,7 +29,9 @@ class PasswordResetForm extends React.Component {
                     <FormattedMessage
                         id='password_form.error'
                         defaultMessage='Please enter at least {chars} characters.'
-                        chars={Constants.MIN_PASSWORD_LENGTH}
+                        values={{
+                            chars: Constants.MIN_PASSWORD_LENGTH
+                        }}
                     />
                 )
             });
-- 
cgit v1.2.3-1-g7c22

