From c5a0ac8c6a5a9dea001f975ac35445b4701a3b2b Mon Sep 17 00:00:00 2001
From: Asaad Mahmood <asaadmahmood@users.noreply.github.com>
Date: Fri, 28 Oct 2016 01:49:32 +0500
Subject: Shift UI changes (#4353)

* Shift UI changes

* Reverting config.json
---
 webapp/components/rhs_root_post.jsx | 14 ++++++++------
 1 file changed, 8 insertions(+), 6 deletions(-)

(limited to 'webapp/components/rhs_root_post.jsx')

diff --git a/webapp/components/rhs_root_post.jsx b/webapp/components/rhs_root_post.jsx
index b8aeeed2d..a0edd716e 100644
--- a/webapp/components/rhs_root_post.jsx
+++ b/webapp/components/rhs_root_post.jsx
@@ -236,12 +236,14 @@ export default class RhsRootPost extends React.Component {
                         data-toggle='dropdown'
                         aria-expanded='false'
                     />
-                    <ul
-                        className='dropdown-menu'
-                        role='menu'
-                    >
-                        {dropdownContents}
-                    </ul>
+                    <div className='dropdown-menu__content'>
+                        <ul
+                            className='dropdown-menu'
+                            role='menu'
+                        >
+                            {dropdownContents}
+                        </ul>
+                    </div>
                 </div>
             );
         }
-- 
cgit v1.2.3-1-g7c22

