From 82b36b3721d6ee129d27c3fc3957d4e37643d4a6 Mon Sep 17 00:00:00 2001
From: Joram Wilander <jwawilander@gmail.com>
Date: Mon, 26 Jun 2017 13:25:43 -0400
Subject: PLT-6815 Do not disconnect websocket when joining a team (#6746)

* Do not disconnect websocket when joining a team

* Fix eslint error
---
 webapp/components/select_team/select_team.jsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'webapp/components/select_team/select_team.jsx')

diff --git a/webapp/components/select_team/select_team.jsx b/webapp/components/select_team/select_team.jsx
index fe706af0f..7c90160bb 100644
--- a/webapp/components/select_team/select_team.jsx
+++ b/webapp/components/select_team/select_team.jsx
@@ -84,7 +84,6 @@ export default class SelectTeam extends React.Component {
                     <SelectTeamItem
                         key={'team_' + openTeam.name}
                         team={openTeam}
-                        url={`/signup_user_complete/?id=${openTeam.invite_id}`}
                         onTeamClick={this.handleTeamClick}
                         loading={this.state.loadingTeamId === openTeam.id}
                     />
-- 
cgit v1.2.3-1-g7c22

