From 04f4545bbd6c9a1f85071483e96e29684871d547 Mon Sep 17 00:00:00 2001
From: Mika Andrianarijaona <mikaoelitiana@users.noreply.github.com>
Date: Sun, 26 Feb 2017 18:13:07 +0300
Subject: PLT-5140: Display loading screen when switching team (#5475)

* fix: clear channel list on team change

* fix committed config

* fix: no need to use anothe var

* fix: better channel list clearing

* remove unused function

* fix: display loading screen when switching team

* fix: display loading screen when switching team

* fix: clear channel list on team change

* fix committed config

* fix: no need to use anothe var

* fix: better channel list clearing

* remove unused function

* remove duplicate EnableUserTypingMessages
---
 webapp/components/sidebar.jsx | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'webapp/components/sidebar.jsx')

diff --git a/webapp/components/sidebar.jsx b/webapp/components/sidebar.jsx
index 048122897..c4c5f0517 100644
--- a/webapp/components/sidebar.jsx
+++ b/webapp/components/sidebar.jsx
@@ -187,6 +187,9 @@ export default class Sidebar extends React.Component {
     }
 
     onChange() {
+        if (this.state.currentTeam.id !== TeamStore.getCurrentId()) {
+            ChannelStore.clear();
+        }
         this.setState(this.getStateFromStores());
         this.updateTitle();
     }
-- 
cgit v1.2.3-1-g7c22

