From 860f2c8332f34d02e53ea1460decb4d1490bcbd4 Mon Sep 17 00:00:00 2001
From: Asaad Mahmood <asaadmahmood@users.noreply.github.com>
Date: Mon, 31 Jul 2017 17:10:43 +0500
Subject: Multiple Ui improvements (#7029)

* PLT-7119 - Updating headings on compact view

* PLT-7103 - Removing line below channel intro

* PLT-7112 - Fixing system console banner

* PLT-7144 - Adding ellipsis to system console boxes

* PLT-7181 - Changing channel header opacity

* PLT-6899 - Updating unread bar

* Updating margin for new messages indicator
---
 webapp/components/sidebar.jsx | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'webapp/components/sidebar.jsx')

diff --git a/webapp/components/sidebar.jsx b/webapp/components/sidebar.jsx
index 25ad51ba9..788f14cd9 100644
--- a/webapp/components/sidebar.jsx
+++ b/webapp/components/sidebar.jsx
@@ -745,15 +745,15 @@ export default class Sidebar extends React.Component {
 
         const above = (
             <FormattedMessage
-                id='sidebar.unreadAbove'
-                defaultMessage='Unread post(s) above'
+                id='sidebar.unreads'
+                defaultMessage='More unreads'
             />
         );
 
         const below = (
             <FormattedMessage
-                id='sidebar.unreadBelow'
-                defaultMessage='Unread post(s) below'
+                id='sidebar.unreads'
+                defaultMessage='More unreads'
             />
         );
 
-- 
cgit v1.2.3-1-g7c22

