From f9aabcab5c4bd564db69a690832b710aaa8c9297 Mon Sep 17 00:00:00 2001
From: Christopher Speller <crspeller@gmail.com>
Date: Mon, 30 May 2016 08:35:47 -0400
Subject: Revert "PLT-2839 Forced sidebar to scroll to top on update" (#3152)

---
 webapp/components/sidebar.jsx | 3 ---
 1 file changed, 3 deletions(-)

(limited to 'webapp/components/sidebar.jsx')

diff --git a/webapp/components/sidebar.jsx b/webapp/components/sidebar.jsx
index be0fb205b..d20fef603 100644
--- a/webapp/components/sidebar.jsx
+++ b/webapp/components/sidebar.jsx
@@ -169,9 +169,6 @@ export default class Sidebar extends React.Component {
             $('.sidebar--left .nav-pills__container').perfectScrollbar();
         }
 
-        this.refs.container.scrollTop = 0;
-        $('.nav-pills__container').perfectScrollbar('update');
-
         // close the LHS on mobile when you change channels
         if (this.state.activeId !== prevState.activeId) {
             $('.app__body .inner-wrap').removeClass('move--right');
-- 
cgit v1.2.3-1-g7c22

