From 7d449e05562c76bb430efc1c36bd715675a84152 Mon Sep 17 00:00:00 2001
From: George Goldberg <george@gberg.me>
Date: Thu, 23 Mar 2017 18:05:36 +0000
Subject: PLT-5755: Infrastructure for Component Testing. (#5814)

This migrates the existing webapp tests to using Jest and Enzyme. The
infrastructure is put in place for React component testing, and a few
simple example component tests are implemented.

This also adds snapshot testing of components, coverage checking for the
webapp (although that is not yet integrated to Coveralls), and the
ability to run npm run test:watch to automatically re-run affected tests
when working on the webapp codebase.
---
 webapp/tests/client_command.test.jsx | 145 -----------------------------------
 1 file changed, 145 deletions(-)
 delete mode 100644 webapp/tests/client_command.test.jsx

(limited to 'webapp/tests/client_command.test.jsx')

diff --git a/webapp/tests/client_command.test.jsx b/webapp/tests/client_command.test.jsx
deleted file mode 100644
index e6795e5d7..000000000
--- a/webapp/tests/client_command.test.jsx
+++ /dev/null
@@ -1,145 +0,0 @@
-// Copyright (c) 2016 Mattermost, Inc. All Rights Reserved.
-// See License.txt for license information.
-
-import assert from 'assert';
-import TestHelper from './test_helper.jsx';
-
-describe('Client.Commands', function() {
-    this.timeout(100000);
-
-    it('listCommands', function(done) {
-        TestHelper.initBasic(() => {
-            TestHelper.basicClient().listCommands(
-                function(data) {
-                    assert.equal(data.length > 0, true);
-                    done();
-                },
-                function(err) {
-                    done(new Error(err.message));
-                }
-            );
-        });
-    });
-
-    it('listTeamCommands', function(done) {
-        TestHelper.initBasic(() => {
-            TestHelper.basicClient().enableLogErrorsToConsole(false); // Disabling since this unit test causes an error
-            TestHelper.basicClient().listTeamCommands(
-                function() {
-                    done(new Error('cmds not enabled'));
-                },
-                function(err) {
-                    assert.equal(err.id, 'api.command.disabled.app_error');
-                    done();
-                }
-            );
-        });
-    });
-
-    it('executeCommand', function(done) {
-        TestHelper.initBasic(() => {
-            const args = {};
-            args.channel_id = TestHelper.basicChannel().id;
-            TestHelper.basicClient().executeCommand(
-                '/shrug',
-                args,
-                function(data) {
-                    assert.equal(data.response_type, 'in_channel');
-                    done();
-                },
-                function(err) {
-                    done(new Error(err.message));
-                }
-            );
-        });
-    });
-
-    it('addCommand', function(done) {
-        TestHelper.initBasic(() => {
-            TestHelper.basicClient().enableLogErrorsToConsole(false); // Disabling since this unit test causes an error
-
-            var cmd = {};
-            cmd.url = 'http://www.gonowhere.com';
-            cmd.trigger = '/hello';
-            cmd.method = 'P';
-            cmd.username = '';
-            cmd.icon_url = '';
-            cmd.auto_complete = false;
-            cmd.auto_complete_desc = '';
-            cmd.auto_complete_hint = '';
-            cmd.display_name = 'Unit Test';
-
-            TestHelper.basicClient().addCommand(
-                cmd,
-                function() {
-                    done(new Error('cmds not enabled'));
-                },
-                function(err) {
-                    assert.equal(err.id, 'api.command.disabled.app_error');
-                    done();
-                }
-            );
-        });
-    });
-
-    it('editCommand', function(done) {
-        TestHelper.initBasic(() => {
-            TestHelper.basicClient().enableLogErrorsToConsole(false); // Disabling since this unit test causes an error
-
-            var cmd = {};
-            cmd.url = 'http://www.gonowhere.com';
-            cmd.trigger = '/hello';
-            cmd.method = 'P';
-            cmd.username = '';
-            cmd.icon_url = '';
-            cmd.auto_complete = false;
-            cmd.auto_complete_desc = '';
-            cmd.auto_complete_hint = '';
-            cmd.display_name = 'Unit Test';
-
-            TestHelper.basicClient().editCommand(
-                cmd,
-                function() {
-                    done(new Error('cmds not enabled'));
-                },
-                function(err) {
-                    assert.equal(err.id, 'api.command.disabled.app_error');
-                    done();
-                }
-            );
-        });
-    });
-
-    it('deleteCommand', function(done) {
-        TestHelper.initBasic(() => {
-            TestHelper.basicClient().enableLogErrorsToConsole(false); // Disabling since this unit test causes an error
-            TestHelper.basicClient().deleteCommand(
-                TestHelper.generateId(),
-                function() {
-                    done(new Error('cmds not enabled'));
-                },
-                function(err) {
-                    assert.equal(err.id, 'api.command.disabled.app_error');
-                    done();
-                }
-            );
-        });
-    });
-
-    it('regenCommandToken', function(done) {
-        TestHelper.initBasic(() => {
-            TestHelper.basicClient().enableLogErrorsToConsole(false); // Disabling since this unit test causes an error
-            TestHelper.basicClient().regenCommandToken(
-                TestHelper.generateId(),
-                function() {
-                    done(new Error('cmds not enabled'));
-                },
-                function(err) {
-                    assert.equal(err.id, 'api.command.disabled.app_error');
-                    done();
-                }
-            );
-        });
-    });
-});
-
-- 
cgit v1.2.3-1-g7c22

