From 1641370fbedc42e07f7a9b7758286d341f13b624 Mon Sep 17 00:00:00 2001
From: Christopher Speller <crspeller@gmail.com>
Date: Tue, 19 Jul 2016 10:16:44 -0400
Subject: Moving javascript driver back to platform (#3613)

---
 webapp/tests/client_general.test.jsx | 85 ++++++++++++++++++++++++++++++++++++
 1 file changed, 85 insertions(+)
 create mode 100644 webapp/tests/client_general.test.jsx

(limited to 'webapp/tests/client_general.test.jsx')

diff --git a/webapp/tests/client_general.test.jsx b/webapp/tests/client_general.test.jsx
new file mode 100644
index 000000000..61e7832da
--- /dev/null
+++ b/webapp/tests/client_general.test.jsx
@@ -0,0 +1,85 @@
+// Copyright (c) 2016 Mattermost, Inc. All Rights Reserved.
+// See License.txt for license information.
+
+var assert = require('assert');
+import TestHelper from './test_helper.jsx';
+
+describe('Client.General', function() {
+    this.timeout(10000);
+
+    it('General.getClientConfig', function(done) {
+        TestHelper.initBasic(() => {
+            TestHelper.basicClient().getClientConfig(
+                function(data) {
+                    assert.equal(data.SiteName, 'Mattermost');
+                    done();
+                },
+                function(err) {
+                    done(new Error(err.message));
+                }
+            );
+        });
+    });
+
+    it('General.getPing', function(done) {
+        TestHelper.initBasic(() => {
+            TestHelper.basicClient().getPing(
+                function(data) {
+                    assert.equal(data.version.length > 0, true);
+                    done();
+                },
+                function(err) {
+                    done(new Error(err.message));
+                }
+            );
+        });
+    });
+
+    it('General.logClientError', function(done) {
+        TestHelper.initBasic(() => {
+            var config = {};
+            config.site_name = 'test';
+            TestHelper.basicClient().logClientError('this is a test');
+            done();
+        });
+    });
+
+    it('File.getFileInfo', function(done) {
+        TestHelper.initBasic(() => {
+            TestHelper.basicClient().enableLogErrorsToConsole(false); // Disabling since this unit test causes an error
+
+            TestHelper.basicClient().getFileInfo(
+                `/${TestHelper.basicChannel().id}/${TestHelper.basicUser().id}/filename.txt`,
+                function(data) {
+                    assert.equal(data.filename, 'filename.txt');
+                    done();
+                },
+                function(err) {
+                    done(new Error(err.message));
+                }
+            );
+        });
+    });
+
+    it('File.getPublicLink', function(done) {
+        TestHelper.initBasic(() => {
+            TestHelper.basicClient().enableLogErrorsToConsole(false); // Disabling since this unit test causes an error
+            var data = {};
+            data.channel_id = TestHelper.basicChannel().id;
+            data.user_id = TestHelper.basicUser().id;
+            data.filename = `/${TestHelper.basicChannel().id}/${TestHelper.basicUser().id}/filename.txt`;
+
+            TestHelper.basicClient().getPublicLink(
+                data,
+                function() {
+                    done(new Error('not enabled'));
+                },
+                function(err) {
+                    assert.equal(err.id, 'api.file.get_public_link.disabled.app_error');
+                    done();
+                }
+            );
+        });
+    });
+});
+
-- 
cgit v1.2.3-1-g7c22

