From 335e5cc4dac6e9caeb6797fb4ce0185245b4c4df Mon Sep 17 00:00:00 2001
From: Christopher Speller <crspeller@gmail.com>
Date: Thu, 26 May 2016 07:58:24 -0400
Subject: Moving tests to javascript client (#3108)

---
 webapp/tests/client_general.test.jsx | 85 ------------------------------------
 1 file changed, 85 deletions(-)
 delete mode 100644 webapp/tests/client_general.test.jsx

(limited to 'webapp/tests/client_general.test.jsx')

diff --git a/webapp/tests/client_general.test.jsx b/webapp/tests/client_general.test.jsx
deleted file mode 100644
index 61e7832da..000000000
--- a/webapp/tests/client_general.test.jsx
+++ /dev/null
@@ -1,85 +0,0 @@
-// Copyright (c) 2016 Mattermost, Inc. All Rights Reserved.
-// See License.txt for license information.
-
-var assert = require('assert');
-import TestHelper from './test_helper.jsx';
-
-describe('Client.General', function() {
-    this.timeout(10000);
-
-    it('General.getClientConfig', function(done) {
-        TestHelper.initBasic(() => {
-            TestHelper.basicClient().getClientConfig(
-                function(data) {
-                    assert.equal(data.SiteName, 'Mattermost');
-                    done();
-                },
-                function(err) {
-                    done(new Error(err.message));
-                }
-            );
-        });
-    });
-
-    it('General.getPing', function(done) {
-        TestHelper.initBasic(() => {
-            TestHelper.basicClient().getPing(
-                function(data) {
-                    assert.equal(data.version.length > 0, true);
-                    done();
-                },
-                function(err) {
-                    done(new Error(err.message));
-                }
-            );
-        });
-    });
-
-    it('General.logClientError', function(done) {
-        TestHelper.initBasic(() => {
-            var config = {};
-            config.site_name = 'test';
-            TestHelper.basicClient().logClientError('this is a test');
-            done();
-        });
-    });
-
-    it('File.getFileInfo', function(done) {
-        TestHelper.initBasic(() => {
-            TestHelper.basicClient().enableLogErrorsToConsole(false); // Disabling since this unit test causes an error
-
-            TestHelper.basicClient().getFileInfo(
-                `/${TestHelper.basicChannel().id}/${TestHelper.basicUser().id}/filename.txt`,
-                function(data) {
-                    assert.equal(data.filename, 'filename.txt');
-                    done();
-                },
-                function(err) {
-                    done(new Error(err.message));
-                }
-            );
-        });
-    });
-
-    it('File.getPublicLink', function(done) {
-        TestHelper.initBasic(() => {
-            TestHelper.basicClient().enableLogErrorsToConsole(false); // Disabling since this unit test causes an error
-            var data = {};
-            data.channel_id = TestHelper.basicChannel().id;
-            data.user_id = TestHelper.basicUser().id;
-            data.filename = `/${TestHelper.basicChannel().id}/${TestHelper.basicUser().id}/filename.txt`;
-
-            TestHelper.basicClient().getPublicLink(
-                data,
-                function() {
-                    done(new Error('not enabled'));
-                },
-                function(err) {
-                    assert.equal(err.id, 'api.file.get_public_link.disabled.app_error');
-                    done();
-                }
-            );
-        });
-    });
-});
-
-- 
cgit v1.2.3-1-g7c22

