From 00e8b6621a7ddf13222144d4acf80421204a23cc Mon Sep 17 00:00:00 2001
From: George Goldberg <george@gberg.me>
Date: Tue, 1 Aug 2017 13:11:29 +0100
Subject: PLT-6595 (Client): Elasticsearch indexing system console UI (#6991)

* PLT-6595: System Console for Elasticsearch Job Management.

* Fixing UI issues

* Fixing colors

* ESLint Fixes.

* Update test snapshots.

* Fixing cancel button

* Fix review comments.

* Config capitalisation.

* Review fixes.
---
 webapp/utils/constants.jsx | 14 ++++++++++++++
 1 file changed, 14 insertions(+)

(limited to 'webapp/utils/constants.jsx')

diff --git a/webapp/utils/constants.jsx b/webapp/utils/constants.jsx
index 31211952a..2b6b17503 100644
--- a/webapp/utils/constants.jsx
+++ b/webapp/utils/constants.jsx
@@ -296,6 +296,20 @@ export const ErrorPageTypes = {
     LOCAL_STORAGE: 'local_storage'
 };
 
+export const JobTypes = {
+    DATA_RETENTION: 'data_retention',
+    ELASTICSEARCH_POST_INDEXING: 'elasticsearch_post_indexing'
+};
+
+export const JobStatuses = {
+    PENDING: 'pending',
+    IN_PROGRESS: 'in_progress',
+    SUCCESS: 'success',
+    ERROR: 'error',
+    CANCEL_REQUESTED: 'cancel_requested',
+    CANCELED: 'canceled'
+};
+
 export const ErrorBarTypes = {
     LICENSE_EXPIRING: 'error_bar.license_expiring',
     LICENSE_EXPIRED: 'error_bar.license_expired',
-- 
cgit v1.2.3-1-g7c22

