From f4dd8e579639637057e8717067bb0627d9eb1de3 Mon Sep 17 00:00:00 2001
From: Thomas Balthazar <tbalthazar@users.noreply.github.com>
Date: Tue, 5 Jul 2016 21:37:21 +0200
Subject: PLT-1316/PLT-3280 Change client-side max file size limit (#3354)

* Change client-side max file size limit

It now relies on the value set in config.json.
Re-enable and tweak the max file size setting in system console.

* Update file upload error message
---
 webapp/utils/constants.jsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'webapp/utils/constants.jsx')

diff --git a/webapp/utils/constants.jsx b/webapp/utils/constants.jsx
index ac00262c3..e748cae4b 100644
--- a/webapp/utils/constants.jsx
+++ b/webapp/utils/constants.jsx
@@ -210,7 +210,6 @@ export default {
     },
     MAX_DISPLAY_FILES: 5,
     MAX_UPLOAD_FILES: 5,
-    MAX_FILE_SIZE: 50000000, // 50 MB
     THUMBNAIL_WIDTH: 128,
     THUMBNAIL_HEIGHT: 100,
     WEB_VIDEO_WIDTH: 640,
-- 
cgit v1.2.3-1-g7c22

